SCHEDULES

SCHEDULE 12 PROTECTIVE PROVISIONS

PART 1 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWERAGE UNDERTAKERS

Application
2 The provisions of paragraph 1 of Schedule 11 (provisions relating to statutory undertakers etc.), in so far as they relate to the removal of apparatus, do not apply in relation to apparatus to which this Part of this Schedule applies.