Fire Services Act 1951 (repealed)
1951 c.27
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Act repealed (1.10.2004 except in relation to W., 10.11.2004 for W.) by Fire and Rescue Services Act 2004 (c. 21), s. 61, Sch. 2; S.I. 2004/2304, art. 2 (with savings for E.S. in S.I. 2004/2306, art. 3, Sch.); S.I. 2004/2917, art. 2 (and with savings for W. in S.I. 2004/2918, art. 3(2), Sch.)