PART 2

SDP Procedure: preparation
Chapter 5

Deposit of SDP

Deposit of proposals
21
Before submitting the SDP to the Welsh Ministers for independent examination under section 64(1) of the 2004 Act, the CJC must—
a
deposit copies of the SDP proposals documents and the statement of deposit matters for inspection during normal office hours at the places at which the pre-deposit proposals documents and the statement of pre-deposit matters were made available for inspection under regulation 18(2)(a);
b
publish on its website—
i
the SDP proposals documents,
ii
the statement of deposit matters, and
iii
a statement that the SDP proposals documents and statement of deposit maters are available for inspection and the places and times at which they may be inspected;
c
send copies of the following to each of the bodies referred to in regulation 16(1)(a)—
i
the SDP,
ii
the sustainability appraisal report,
iii
the initial consultation report,
iv
a list of such supporting documents as the CJC considers relevant to the preparation of the SDP,
v
the statement of deposit matters, and
vi
the statement referred to in paragraph (b)(iii).