The community of Pembroke Dock: consequential changes to electoral arrangements
9
In the community of Pembroke Dock—
a
the number of members to be elected for the Bufferland ward is 3;
b
the number of members to be elected for the Bush ward is 3;
c
the number of members to be elected for the Central ward is 4;
d
the number of members to be elected for the Pennar ward is 3.
Art. 9 in force at 27.10.2021 for specified purposes, see art. 1(2)
Art. 9 in force at 5.5.2022 in so far as not already in force, see art. 1(3)