PART 1 Introduction

3 Expiry
1 These Regulations expire at the end of the day on 18 April 2022.
Words in reg. 3(1) substituted (26.3.2022) by The Health Protection (Coronavirus Restrictions) (No. 5) (Wales) (Amendment) (No. 7) Regulations 2022 (S.I. 2022/378), regs. 1(2), 3
2 This regulation does not affect the validity of anything done pursuant to these Regulations before they expire.
Reg. 3 in force at 18.9.2020 at 12.01 a.m., see reg. 1(3)