2016 No. 811 (W. 201)

Clean Air, Wales

The Smoke Control Areas (Exempted Classes of Fireplace) (Wales) Order 2016 (revoked)
Made
26 July 2016
Laid before the National Assembly for Wales
29 July 2016
Coming into force
22 August 2016
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Title, commencement and application
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Classes of fireplace exempted from the provisions of section 20 of the Clean Air Act 1993
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Revocation
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE

EXEMPTED CLASSES OF FIREPLACE
Article 2
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Order revoked (7.4.2017) by The Smoke Control Areas (Exempted Classes of Fireplace) (Wales) Order 2017 (S.I. 2017/423), arts. 1(1), 3