EXPLANATORY NOTE
(This note is not part of the Regulations)
These Regulations amend the National Health Service (Optical Charges and Payments) Regulations 1997 (“the Optical Regulations”) which provide for payments to be made by means of a voucher system in respect of costs incurred by certain categories of persons in connection with sight tests and the supply, replacement and repair of optical appliances.
Regulation 2 and the Schedule amend Schedules 1, 2 and 3 to the Optical Regulations to increase the value of vouchers issued towards the cost of the supply and replacement of glasses and contact lenses, to increase the additional values for vouchers for prisms, tints, photochromic lenses and special categories of appliances and to increase the value of vouchers issued towards the cost of the repair and replacement of optical appliances.
Regulation 3 makes transitional provision in relation to vouchers accepted or used before 31 March 2015.
The Welsh Ministers’ Code of Practice on the carrying out of Regulatory Impact Assessments was considered in relation to these Regulations. As a result, it was not considered necessary to carry out a regulatory impact assessment as to the likely costs and benefits of complying with these Regulations.