2014 No. 3127 (W. 316) (C. 136)
Housing, Wales
The Housing (Wales) Act 2014 (Commencement No. 1) Order 2014
Made 24 November 2014

The Welsh Ministers make the following Order in exercise of the powers conferred on them by section 145(3) of the Housing (Wales) Act 2014.
2014 anaw 7.