EXPLANATORY NOTE
(This note is not part of the Regulations)
These Regulations amend the National Health Service (Optical Charges and Payments) Regulations 1997 (“the Optical Regulations”).
Regulation 2 amends regulation 1 of the Optical Regulations so as to make reference to a 1% increase in the NHS sight test fees.
The Welsh Ministers’ Code of Practice on the carrying out of Regulatory Impact Assessments was considered in relation to these Regulations. As a result, it was not considered necessary to carry out a regulatory impact assessment as to the likely costs and benefits of complying with these Regulations.