2005 No. 583 (W.49)

ANIMALS, WALES

ANIMAL HEALTH

The Diseases of Animals (Approved Disinfectants) (Amendment) (Wales) Order 2005
Made
8 March 2005
Coming into force
1 April 2005
The National Assembly for Wales, in exercise of its powers under sections 1, 7 and 23(f) and (g) of the Animal Health Act 1981 , which are now vested in it makes the following Order:

Title, commencement and application
1
1
This Order may be cited as the Diseases of Animals (Approved Disinfectants) (Amendment) (Wales) Order 2005 and comes into force on 1 April 2005.
2
This Order applies to Wales only.

Amendments to the Diseases of Animals (Approved Disinfectants) Order 1978
2
1
The Diseases of Animals (Approved Disinfectants) Order 1978 (“the 1978 Order”) is amended in relation to Wales in accordance with 'the following provisions of this article.
2
In paragraph (2) of article 6 of the 1978 Order (which specifies the date until which disinfectants subject to transitional provisions remain approved), for “31st August 2003” there is substituted “30 June 2005”.
3
For Schedule 1 to the 1978 Order (which lists approved disinfectants) there is substituted Schedule 1 to this Order.
4
For Schedule 2 to the 1978 Order (which lists disinfectants subject to transitional provisions) there is substituted Schedule 2 to this Order.

Revocations
3
The following are revoked —
a
Diseases of Animals (Approved Disinfectants) (Amendment) (Wales) Order 2001 ;
b
The Diseases of Animals (Approved Disinfectants) (Amendment)Order 1999 to the extent that it relates to Wales.
Signed on behalf of the National Assembly for Wales under section 66(1) of the Government of Wales Act 1998
D. Elis-Thomas
The Presiding Officer of the National Assembly
8 March 2005
SCHEDULE 1

Schedule to be substituted for Schedule 1 to the 1978 Order
Article 2(3)
SCHEDULE 1

Approved disinfectants
Articles 4 and 5
| Orders in respect of which use is approved; and dilution rates
Disinfectant | Foot and Mouth Disease Orders | Swine Vesicular Diseases Orders | Diseases of Poultry Order | Tuberculosis Orders | General Orders
* The volume of mls. of water to which 1 g of the product is to be added.
Action Iodophor Disinfectant (New Formulation) | 525 | 400 | 150 | 15 | 110
Activate 04 | — | — | 50 | — | 25
Agri Disinfex | 550 | 600 | 125 | 20 | 180
Agrichlor | — | — | 953 | — | 360
Agricide | 100 | 300 | 300 | — | —
AgriGene | — | — | — | — | 50
Agrimar lodophor Disinfectant | 550 | 600 | 125 | 20 | 180
Agrisept MC Tabs | 271 , | 448 | 271 | — | 450
Alodine (New Formulation) | 525 | 400 | 150 | — | 110
Alpharma Vetrechlor | — | 448 | 271 | — | 450
Alpharma Vetredine | 550 | 600 | 125 | 20 | 180
Alpharma Vetrekill | 60 | 300 | 150 | 20 | 50
Alpharma Vetroxide PA | 99 | 20 | 100 | 61 | 158
Alzogur | — | — | — | — | 2
Annihilate | 50 | 30 | 20 | — | 30
Annihilate ACR | 50 | 30 | 20 | — | 30
Antec Ambicide | — | — | — | — | 30
Antec Chicgard | — | — | — | — | 31
Antec Farm Fluid S | 700 | 200 | 200 | 30 | 115
Antec Hipodine | 450 | 300 | 130 | — | 180
Antec Hyperox | 150 | 50 | 375 | — | 179
Antec Longlife | — | — | 60 | — | 60
Antec Longlife 250 S | 500 | 200 | 250 | 25 | 90
Antec New Formula Farm Fluid | 300 | 110 | 70 | 35 | 65
Antec Ovation | — | — | — | — | 46
Antec Virkon E | 1300 | 200 | 280 | — | 120
Antec Virkon S | 1300 | 200 | 280 | — | 120
Antec Virudine | 600 | 650 | 140 | — | 125
Antigermen Potente | 525 | 400 | 150 | 15 | 110
Avi-Cleanse | 240 | 300 | 80 | — | 100
Bactacol KK Disinfectant (New Formulation) | 80 | 250 | 190 | — | —
Bactipal5.22 | 500 | 80 | 150 | — | 200
Bactipal DB | 500 | 80 | 150 | — | 178
Ballista | 200 | — | 200 | — | 200
Barrier V1 | — | — | 50 | — | 40
Battles Black Disinfectant Fluid | — | — | 45 | — | 60
Battles Universal Disinfectant Fluid | 300 | — | 60 | 37 | —
Battles White Disinfectant Fluid | — | — | 50 | — | 60
Betane Plus | — | — | 50 | — | 15
Biocid | 525 | 400 | 150 | 15 | 110
Biocid 15 | 250 | 300 | 100 | — | 50
Biocid 30 | 550 | 600 | 125 | 20 | 180
Bio-Dine | — | — | 145 | — | —
Bio-Guard | — | — | 80 | — | —
Bio-Kill | 140 | — | 365 | — | 160
Bio-oo-cyst | — | — | 125 | — | —
Bio-Phen | — | 175 | 190 | — | —
Bio-Phen Plus | 400 | 160 | 210 | — | —
Bio-Shield | — | — | 155 | — | —
Biospot | — | — | 953 | | 360
Bio-VX | 1200 | 135 | 285 | — | 100
Black Disinfectant | — | — | 41 | — | 80
Black Extreme | 710 | — | 200 | — | —
Blitz ' | 800 | 160 | 145 | 44 | 256
Breaker | 200 | — | 200 | — | 200
C S Disinfectant | — | — | 65 | — | 40
Carela Bio Plus | 9 | — | — | — | —
Carela Bio-Des | 99 | — | — | — | —
Cascade Disinfectant | 800 | 160 | 145 | 44 | 256
Chemtab | — | — | 953 | — | 360
Chlorisept | — | — | 953 | — | 360
Citric Acid BP | 500 | — | — | — | —
Clinidine | 320 | — | 140 | — | —
Clinidine 28 | 500 | 400 | 170 | — | —
Combat 2 | 550 | 600 | 125 | 20 | 180
Commando (New Formulation) | 80 | 250 | 190 | — | —
Credence 200 | 299 | 299 | 449 | — | 229
Cromessol New Animal Health Care Disinfectant (New Formulation) | 80 | 250 | 190 | — | —
D50 | 800 | 160 | 145 | — | 256
Defence 7 | 100 | 300 | 300 | — | —
Delladet VS2 | — | — | — | — | 10
Deptil AF | — | — | 100 | — | —
Detsan 1 | — | — | — | — | 25
Disteola | 240 | 300 | 80 | — | 100
Divosan DB | — | — | 60 | — | 49
Emprasan Approved Iodine Disinfectant | — | — | — | — | 111
Euractive S+ | 99 | 300 | 150 | | 37
Envirocare A | 99 | 99 | 99 | — | 99
Envirocide + | — | — | 145 | — | —
Enviroguard | 60 | 300 | 150 | 10 | 50
Equigard | — | 50 | 100 | — | 22
Equisept | 271 | — | — | — | 450
ERFS White Disinfectant Fluid | — | — | 50 | — | 60
F10SC General Farm Disinfectant | 499 | — | — | — | —
F10SC Veterinary Disinfectant | — | — | 35 | — | 9
FAM | 525 | 500 | 100 | — | 110
FAM (New Formulation) | 525 | 400 | 150 | 15 | 110
FAM 15 | 250 | 300 | 100 | — | 50
FAM 30 | 550 | 600 | 125 | 20 | 180
FAM 30C | 891 | 970 | 200 | 30 | 290
Farm Phenol + | — | 175 | 190 | — | —
Farm Phenol Super + | — | — | 210 | — | —
FarmKlear | 80 | 250 | 190 | — | —
Farmsan | 550 | 600 | 125 | 20 | 180
Formalin BP (Containing not less than 34% Formaldehyde) | 9 | 9 | — | — | —
Genus Universal (New Formulation) | 550 | 600 | 125 | 20 | 180
GeoSIL | — | — | — | — |
Germacert FG Plus | — | — | 10 | — | —
GPC8 | 80 | — | 200 | — | —
GPC8 (New Formulation) | 80 | 250 | 190 | — | —
Halamid | 200 | 90 | 1000 | — | 300
Haztab | — | — | 953 | — | 360
Hemex Chlor Powder | — | 2000 | 500 | — | 530
Hemexol Iodine Liquid | 160 | 140 | 100 | — | 110
Hemexol Iodine Liquid Plus | — | 800 | 200 | — | 200
Hemexol Liquid G | — | 50 | 75 | — | 18
Hemexol V 260 | — | 220 | 260 | — | 103
Hemexol Virucidal Powder | 1300 | — | — | — | —
HPPA | — | — | 400 | — | 190
Hyprelva 4+ | — | 400 | 90 | 4 | 37
Hyprelva SF | 99 | 300 | 150 | — | 37
Hysol | 70 | 20 | — | — | 100
Hysol 1 + 2 | 70 | — | — | — | 100
Hyspray PA 5 | 99 | 20 | 350 | — | 158
Incidin AL | 30 | 400 | 90 | — | 19
Incidin OXI | 500 | 80 | 150 | — | 178
Incidin PD | — | — | 20 | — | 32
Intercept | 150 | 450 | 200 | — | 200
Iodocleanse New Formulation | 600 | 650 | 160 | — | —
Iodel FD 11 | 450 | 500 | 145 | 15 | 150
Iodet | 525 | 500 | 100 | — | 110
Jentabs Agriculture | 299 | 299 | 449 | — | 299
Jentabs Professional | — | — | 953 | — | 360
Jewel-Black 34 | — | — | — | — | 77
Jeyes Fluid | — | — | 30 | — | 50
Kennel Safe Disinfectant (New Formulation) | 80 | 250 | 190 | — | —
Kick Start (2) | 800 | 160 | 145 | 44 | 256
Kilcrobe WO Disinfectant Fluid Special Grade | — | — | — | — | 99
Killgerm Black Disinfectant RW Coefficient 18/22 | — | — | 41 | — | 80
Killgerm lodair | 250 | 260 | 61 | — | —
Killgerm Lysol BP | — | — | 50 | — | 49
Killgerm White Farm Disinfectant | — | — | 21 | — | 100
Kirbychlor | 271 | 448 | 271 | — | 450
Leecyl Farm Disinfectant | | | 50 | | .
Life Guard (New Formulation) | 80 | 250 | 190 | — | —
Lindores 30 | 550 | 600 | 125 | 20 | 180
Lysol BP 1968 | 9 | — | 39 | — | 49
Micro-Chlor | — | 100 | 250 | — | 210
Microcide 755N | — | — | 50 | — | 15
Microdine | 160 | 140 | 100 | — | 110
Micro-Quat | — | — | — | — | 15
Milton Double Concentrate | — | 100 | — | — | 25
MP36 | 99 | 99 | 99 | — | 99
Novagen FP | 240 | 180 | 80 | 18 | 145
Omnicide | 60 | 300 | 150 | — | 50
Omnicide Extra | — | 300 | 175 | — | 27
Ortho-phosphoric Acid (Technical Grade) | 330 | — | — | — | —
Ovitek Biocidal Sol. Concentrate | — | — | 200 | — | 25
Oxykil | 800 | 160 | 145 | — | 256
Oxysan Max | — | — | 365 | — | —
P100 + | — | — | 80 | — | —
P100 Max | — | — | 155 | — | —
Parvovirucide | 100 | 300 | 300 | — | —
Parvocide Plus | 60 | 300 | 150 | 10' | 50
Perbac Farm | 800 | 160 | 145 | — | 256
Pet Safe | — | — | Use undiluted | — | —
Phoraid Disinfectant | — | — | — | — | 25
Phor-Vet | — | — | — | — | 25
Pinalene | — | — | — | — | 11
Powerkill | 1300 | 300 | 300 | — | 112
Premier | — | — | — | — | 10
Prosept | — | 240 | 130 | — | —
Proxitane AHC (2) | 800 | 160 | 145 | — | 256
Purogene | 250 | 240 | 20 | — | 22
QC lodocleanse | — | — | 140 | — | —
QC Virukill 260 | — | — | 260 | — | —
Quatdet Clear | — | — | — | — | 13
Rapicid | 550 | 600 | 125 | 20 | 180
Response 904 Vet | — | — | 29 | — | —
RyodophorSP | 240 | 160 | 91 | — | 145
San-5-Pine | — | — | — | — | 11
Secure lodophor Disinfectant | 150 | — | 30 | — | 30
Septrivet 17 | 299 | 299 | 449 | — | 299
Sodium Carbonate (Decahydrate) Complying with BS 3674 of 1963 | 24 | — | — | — | —
Sodium Hydroxide | — | 100 | — | — | —
Somplex Detsan | — | —— | — | — | 8
Sorgene 5 | 75 | 75 | 100 | 75 | 200
Sorgene Biodine | 215 | 234 | 130 | — | 147
Stable Safe Disinfectant (New Formulation) | 80 | 250 | 190 | — | —
Stableguard | 150 | 450 | 200 | — | 200
Steril Tabs | 200 | — | 200 | — | 200
Sterilite Farm Disinfectant Extra | 840 | 400 | 200 | 20 | 82
Sterilite Virucidal Disinfectant | 60 | 300 | 150 | 10 | 50
Sterilite White Disinfectant | — | — | 45 | — | —
Sulphamic Acid | 500 | — | — | — | —
Super Fluid F | — | 175 | 190 | — | —
Super Strong F | 400 | 160 | 210 | — | —
Super Virucidal | 1200 | 135 | 285 | — | —100
Supercide | 150 | 450 | 200 | — | 200
Supercide Max | — | — | 155 | — | —
Supercide Plus | — | 300 | 175 | — | 27
Superdine | 550 | 600 | 125 | 20 | 180
Superdine Max | 550 | — | — | 33 | —
Superdine Plus | — | — | 145 | — | —
Superguard | 150 | 450 | 200 | — | 200
Superkill | — | 50 | 100 | — | 22
Superkill Plus | — | — | 80 | — | —
Superperacetic Plus | 140 | — | 365 | — | 160
Surekill | — | — | 40 | — | 20
SWC Bacto Detsan | 20 | 10 | — | — ' | 10
SWC Bacto Detsan Defoamed | 20 | 10 | — | — | 10
SWC Broadol (New Formulation) | 80 | 250 | 190 | — | —
SWC Maxikleen | 600 | 400 | 100 | — | 43
SWC V3 | 1300 | 300 | 300 | — | 112
Ultracide | 100 | 300 | 300 | — | —
Tegodor Farm | — | — | 51 | — | —
Tegodor Farm New | — | — | 51 | — | —
Terminal Black-Black Fluid RW 34 | — | — | — | — | 77
Terminol | — | — | — | — | 33
TK10 | 150 | 450 | 200 | — | 200
TK12 | — | 50 | 100 | — | 22
Total | 50 | 30 | 20 | — | 30
Total Farm Disinfectant | 550 | 600 | 125 | 20 | 180
V26 | 200 | 200 | 300 | — | 200
Vanodin | 525 | 400 | 150 | 15 | 110
Vanodine | 525 | 400 | 150 | 15 | 110
Vanodine FAM | 525 | 400 | 150 | 15 | 110
Vanodox | 200 | 30 | 300 | — | 300
Vanoquat | — | — | — | — | 7
Venno FF Super | 50 | — | 150 | 25 | 88
Vesphene D39 | 10 | — | 50 | — | 55
Vibacide | 100 | — | 40 | — | 17
Viktor | — | — | 280 | — | 120
Viragi Plus | — | — | 190 | — | —
Viraguard (New Formulation) | 80 | 250 | 190 | — | —
Viratec P | 1300 | — | 150 | — | 100
Virex | 1300 | 200 | 300 | — | 112
VI-RID | — | — | 10 | — | —
Virkon Professional | 1300 | 200 | 280 | — | 120
Virochlor | 271 | 448 | 271 | — | 450
Viro-Cid | 100 | 250 | 150 | — | —
Virofree | 200 | — | 300 | — | 150
Viroguard | — | — | 175 | — | —
Virophen | — | 200 | 210 | — | —
Virophen Plus | — | — | 240 | — | —
Virophor 2.8% | 550 | — | 185 | 33 | 50
Viroshield | — | — | — | — | 25
Viroshield | — | — | 165 | — | 25
Viroxide Super | 1320 | 220 | — | — | —
Virucidal Extra | 1300 | 300 | 300 | — | 112
Virucide + | — | — | 285 | — | —
Zal Perax (2) | 800 | 160 | 145 | 44 | 256
Zoetox 5 | — | — | 50 | — | 50
SCHEDULE 2

Schedule to be substituted for Schedule 2 to the 1978 Order
Article 2(4)
SCHEDULE 2

APPROVED DISINFECTANTS SUBJECT TO TRANSITIONAL PROVISIONS
Articles 4 and 6
| Orders in respect of which use is approved; and dilution rates
Disinfectant | Foot and Mouth Disease Orders | Swine Vesicular Diseases Orders | Diseases of Poultry Order | Tuberculosis Orders | General Orders
Agilan Red Label | — | — | — | 30 | —
Agilan Red Label | 550 | 600 | 125 | 30 | 180
Agri Disinfex | — | — | — | 30 | —
Agrimar lodo hor Disinfectant | — | — | — | 30 | —
Alkarma Vetredine | — | — | — | 30 | —
Alkarma Vetrekill 200 | 840 | 400 | 200 | 20 | 82
Antec Black Fluid | — | — | 52 | — | 60
Antec Farm Fluid | 219 | 100 | 39 | 24 | 29
Antec Farm Fluid S | — | — | — | 50 | —
Antec Hi odine | — | — | — | 30 | —
Antec H erox | — | — | — | 100 | —
Antec Lon life 200 | — | 160 | 200 | — | —
Antec New Formula Farm Fluid Extra | 250 | 150 | 80 | 60 | 85
Antec New Formula White Fl id | — | — | 45 | 83 | 103
Antec Safehands | — | — | — | — | 2
Antec Virudine | — | — | — | 51 | —
Avi-Cleanse | — | — | — | 25 | —
Bacti a15.22 | — | — | — | 135 | —
Bacti al DB | — | — | — | 90 | —
Battles lofarm lodophor Disinfectant & Dairy Detergent Steriliser | 550 | 600 | 125 | 20 | 180
Battles White Disinfectant Fluid | — | — | — | 50 | —
Biocid 30 | — | — | — | 30 | —
Bio - Cleanse | 1100 | 120 | 150 | — | 100
Biotal Pet Disinfectant | — | — | — | — |
Use undiluted Black Disinfectant 34+ | — | — | — | — | 77
Citrox | — | — | 0.66 | — | —
Clearsol | — | — | — | 45 | —
Centiklene Black Fluid Disinfectant | — | — | 20 | — | —
Deosan lodel FD | — | — | — | 26 | —
Deocide PA Disinfectant 2 | 800 | 160 | 145 | 44 | 256
Deosan lodel FD | 215 | 234 | 130 | — | 147
Disteola | — | — | — | 25 | —
Envirocide | 550 | 600 | 125 | 20 | 180
ERFS White Disinfectant Fluid | — | — | — | 50 | —
Euractive S+ | 99 | 300 | 150 | 90 | 37
Everbrite FG Extra | — | — | 10 | — | —
FAM | — | — | — | 15 | —
Farm Care 95 (New Formulation) | 80 | 250 | 190 | — | —
Farmsan | — | — | — | 30 | —
Farmod ne | 550 | 600 | 125 | 20 | 180
Farm Ox san Plus | 200 | 30 | 300 | — | 300
Genus Universal (New Formulation) | — | — | — | 30 | —
Halamid | — | — | — | 20 | —
H colin | — | — | 40 | — | 28
H relva SF | — | — | — | 90 | —
H s ra PA 5 | — | — | — | 61 | —
Imact | 1300 | 300 | 300 | — | 112
Iodel FD | — | — | — | 26 | —
Iodet | — | — | — | 15 | —
Iodosure Bio | 240 | 160 | 110 | — | 25
Kill germ Lysol BP | — | — | — | 39 | —
Kill germ White Farm Disinfectant | — | — | — | 66 | —
Lifeline | — | 50 | 75 | — | 18
Lindores 30 | — | — | — | 30 |
Lysol BP 1968 | —: | — | — | 39 | —
L sovet PA | 50 | — | 50 | — | —
Macroclor | 271 * | 448* | 271 * | — | 450*
Macroclor 1000 | — | 2000 | 500 | — | 530
Macrod ne 200 | — | 800 | 200 | — | 200
Macrod ne 200 | — | — | — | 40 | —
Macrokil200 | — | 300 | 220 | — | 64
Macroline-500 | — | 220 | 260 | — | 103
Macromist | — | — | 50 | — | 15
Maxi Guard | 240 | 300 | 80 | 25 | 100
Maxikleen | — | — | — | 45 | —
Master SVD Solution | — | 9 | — | — | —
Mira 30 | 550 | 600 | 125 | 20 | 180
Mira 8 | 80 | 250 | 190 | — | —
Nova en FP | — | — | — | 22 | —
Omnicide | — | — | — | 10 | —
Omnicide Extra | — | — | — | 38 | —
P100 (New Formulation) | 80 | 250 | 190 | — | —
Peratol | 75 | 75 | 100 | — | 200
Peroxide | 1320 | 220 | — | — | —
Pet VSan | 1100 | 120 | 150 | — | 100
Phenoxide | — | — | 260 | — | —
Pol kil+ Disinfectant | — | 300 | — | — | 180
Powercide | 1300 | 300 | 300 | — | 112
Pro- Cleanse | 1100 | 120 | 150 | — | 100
Prodo hor | — | 700 | 155 | — | 160
Protekol | — | — | 250 | — | —
Proxide | — | 250 | 400 | — | 160
Proxitane AHC (2) | — | — | — | 44 | —
Prozone | — | — | 500 | — | 256
Puro ene | — | — | — | 20 | —
Rapicid | — | — | — | 30 | —
Ryodophor SP | — | — | — | 25 | —
San Protect WS | 99 | 300 | 150 | — | 37
Secure Iodopher | — | — | — | — | 30
Sorgene Biodine | — | — | — | 26 | —
Sterilite 2000 | 1300 | 300 | 300 | — | 112
Sterilite PA | 800 | 160 | 145 | 44 | 256
Sudol | — | — | 60 | — | 70
Superdine | — | — | — | 30 | —
Suaperacetic | 800 | 160 | 145 | — | 256
Surekill | — | — | — | — | 20
Tego 2000 | — | — | — | — | 32
Tego 2001 | — | — | — | — | 16
Total Farm Disinfectant | — | — | — | 30 | —
V26 | — | — | — | 105 | —
Vesphene D39 | — | — | — | 70 | —
Vibacide | — | — | — | 6 | —
Viro-CID | — | — | — | 50 | —
Virucidal Extra Mk 2 | — | 200 | 300 | — | 90
Virucidal Plus | 280 | 110 | 150 | — | 77
Virudine | — | — | 140 | — | —
Zal Fluid | — | — | — | — | 77
(This note is not part of the Order)
This Order amends the Diseases of Animals (Approved Disinfectants) Order 1978 (“the 1978 Order”), S.I. 1978/32 and revokes earlier amendment Orders. It substitutes for Schedules 1 and 2 to the 1978 Order the Schedules set out in this Order. Schedule 1 lists disinfectants approved by the National Assembly for Wales and Schedule 2 lists disinfectants which, although no longer approved, can continue to be used as approved disinfectants until 30 June 2005.
This Order was notified in draft to the European Commission in accordance with Directive 98/34/EC, as amended by Directive 98/48/EC.
A Regulatory Appraisal has been prepared. Copies may be obtained from the Animal and Plant Health Division of the Welsh Assembly Government, Cathays Park, Cardiff CF10 3NQ.
1981. c.22. The functions of “the Ministers” under the Animal Health Act 1981 so far as exercisable in relation to Wales were transferred to the National Assembly for Wales by the National Assembly for Wales (Transfer of Functions Order) 2004 (S.I. 2004/3004).
S.I. 1978/32 (as amended by S.I. 1978/394, S.I. 1999/919 and S.I. 2001/641 W.31).
S.I. 2001/641 (W.31)
S.I. 1999/919
1998 c. 38