Traffic Signs Regulations and General Directions 2002
74
1
The Traffic Signs Regulations and General Directions 2002 are amended as follows.
2
In the following provisions, after the words “fire brigade” insert “or, in England or Wales, fire and rescue authority” in each place where the words occur—
a
regulation 15(2) (significance of a certain sign);
b
regulation 26(5)(b) (road markings shown in a certain diagrams);
c
regulation 27(3)(c) (road markings shown in certain diagram);
d
regulation 36(1)(b) (significance of light signals prescribed by certain regulations); and
e
paragraph 4(1)(a) of Schedule 19 (bus stop and bus stand clearways and box junctions).
S.I. 2002/3113 to which there are amendments not relevant to this instrument.
Art. 74 in force at 25.10.2005, see art. 1(1)