Combined Fire Authorities (Secure Tenancies) (Wales) Regulations 1998
46
1
The Combined Fire Authorities (Secure Tenancies) (Wales) Regulations 1998 are amended as follows.
2
For regulation 2 (interpretation), substitute—

Interpretation
2
In these Regulations “combination scheme” means a scheme under section 2 of the Fire and Rescue Services Act 2004 or a scheme to which section 4 of that Act applies.
.
3
In regulation 3 (secure tenancies)—
a
for regulation 3(1), substitute—
1
This regulation applies in relation to a fire and rescue authority constituted by a combination scheme.
; and
b
in regulation 3(2), for the words “combined fire authority” substitute “fire and rescue authority”.
S.I. 1998/2214.
Art. 46 in force at 25.10.2005, see art. 1(1)