Safety of Sports Grounds Regulations 1987
14
1
The Safety of Sports Grounds Regulations 1987 are amended as follows.
2
In regulation 5(6) (notices by local authorities)—
a
at the end of sub-paragraph (c) delete “and”;
b
after sub-paragraph (c) insert—
ca
in relation to England and Wales—
i
the fire and rescue authority, where the local authority is not the fire and rescue authority; and
ii
the building authority, where the local authority is not the building authority; and
; and
c
in sub-paragraph (d) delete the words “Wales and”.
3
In paragraph 4(a) of the form contained in the Schedule (application for a safety certificate), after the words “fire authority” insert “or fire and rescue authority”.
S.I. 1987/1941.
Art. 14 in force at 25.10.2005, see art. 1(1)