(This note is not part of the Regulations)
These Regulations, which apply to Wales only, implement the following Community legislation —
Council Directive 88/166/EEC laying down minimum standards for the protection of laying hens kept in battery cages (OJ No. L74, 19.3.88, p.83);
Council Directive 91/629/EEC laying down minimum standards for the protection of calves (OJ No. L340, 11.12.91, p.28), as amended by Council Directive 97/2/EC (OJ No. L25, 28.1.97, p.24) and Commission Decision 97/182/EC (OJ No. L76, 24.2.97. p.30);
Council Directive 91/630/EEC laying down minimum standards for the protection of pigs (OJ No. L340, 11.12.91, p.33); and
Council Directive 98/58/EC concerning the protection of animals kept for farming purposes (OJ No. L221, 8.8.98, p.23).
The Regulations (and the Community legislation which they implement) reflect the obligations contained in the European Convention for the Protection of Animals kept for Farming Purposes of 10th March 1976 (European Treaty Series No.87), as read with the Protocol of Amendment to the European Convention for the Protection of Animals kept for Farming Purposes of 6th February 1992 (European Treaty Series No.145).
The Regulations apply to all animals kept for farming purposes (subject to certain limited exceptions) (regulation 2(2)).
Regulation 3(1) lays down the general principle that owners and keepers of animals kept for farming purposes must take reasonable steps to ensure the welfare of animals in their care and to prevent them any unnecessary pain, suffering or injury. This principle applies to all animals (including fish, reptiles and amphibians).
The Regulations also provide for general requirements as to the conditions in which all farmed animals (other than fish, reptiles and amphibians) are bred or kept (regulation 3(2) and Schedule 1) and for specific additional requirements as to the conditions in which laying hens kept in battery cages (regulation 4 and Schedule 2), poultry (other than laying hens kept in battery cages) (regulation 5 and Schedule 3), calves (regulation 6 and Schedule 4), cattle (regulation 7 and Schedule 5), pigs (regulation 8 and Schedule 6) and rabbits (regulation 9 and schedule 7) are bred or kept.
Regulation 10 contains provision to ensure that those in charge of animals have access to copies of the welfare codes issued under section 3 of the Agriculture (Miscellaneous Provisions) Act 1968 which apply to the animals being bred or kept and that they are acquainted with those codes. Information relating to the welfare codes that have been issued under the 1968 Act may be obtained from the National Assembly for Wales, Agriculture Policy Division , Cathays Park, Cardiff, CF10 3NQ.
Regulation 11 provides for the service of enforcement notices requiring action to be taken to deal with any breach of the Regulations and regulation 12 provides for a power of entry for persons authorised by the European Commission for the purpose of enforcing Community legislation.
Under regulation 13(1), any contravention of the Regulations is an offence under section 2 of the Agriculture (Miscellaneous Provisions) Act 1968. Under section 7 of that Act, the maximum penalty for such an offence is 3 months imprisonment and/or a fine at level 4 on the standard scale (currently, £2,500).
These regulations revoke and replace (with amendments):
The Welfare of Livestock Regulations 1994 (S.I. 1994/2126, amended by S.I. 1998/1709); and
The Welfare of Livestock (Amendment) Regulations 1998 (S.I. 1998/1709).
Schedule 1, which provides for general requirements as to the conditions in which all farmed animals (other than fish, reptiles and amphibians) are bred or kept, contains a number of changes from corresponding provisions in Schedule 4 of the Welfare of Livestock Regulations 1994 (as amended).
In particular, there are a number of requirements which, under the 1994 Regulations, applied only to either animals kept in intensive systems or animals kept in buildings, but the scope of which is now extended to cover all farmed animals (other than fish, reptiles and amphibians). There are also a number of new requirements.
A Regulatory Appraisal has been prepared and published on the National Assembly for Wales web-site (www.wales.gov.uk) Copies may also be obtained from National Assembly for Wales, Agriculture Policy Division , Cathays Park, Cardiff, CF10 3NQ.