PART 5

POWERS OF ACQUISITION

Apparatus and rights of statutory undertakers in stopped up streets
32
Where a street is stopped-up or altered or diverted or its use is temporarily prohibited or restricted under article 8 (street works), article 9 (power to alter layout, etc. of streets), article 10 (construction and maintenance of altered streets), article 11 (temporary closure of and permitting vehicular use on public rights of way) or article 12 (claimed public right of way) any statutory undertaker whose apparatus is under, in, on, along or across the street has the same powers and rights in respect of that apparatus, subject to Schedule 15 (protective provisions), as if this Order had not been made.
Art. 32 in force at 3.8.2024, see art. 1
Words in art. 32 substituted (1.11.2024) by The Mallard Pass Solar Farm (Correction) Order 2024 (S.I. 2024/1088), art. 1(2), Sch.