PART 3 Miscellaneous amendment to the Gas Safety (Management) Regulations 1996

17 Amendment to the Gas Safety (Management) Regulations 1996
In regulation 10(2)(b) (pipes used to convey biogas or gas made from biogas: transitional provisions) of the Gas Safety (Management) Regulations 1996, for “before or after 6th October 2024” substitute “before, on or after 6th October 2024”.
S.I. 1996/551. This instrument was amended by S.I. 1999/3242, 2013/1471 and 2023/284.