PART 1 Introductory

1 Citation, commencement, extent and application
1 These Regulations may be cited as the Health and Safety and Nuclear (Fees) (Amendment) and Gas Safety (Miscellaneous Amendment) Regulations 2024 and come into force on 1st April 2024.
2 These Regulations extend to Great Britain.
3 These Regulations apply to any work outside Great Britain to which sections 1 to 59 and 80 to 82 of the 1974 Act apply by virtue of the Health and Safety at Work etc. Act 1974 (Application Outside Great Britain) Order 2013 as they apply to work in Great Britain.
S.I. 2013/240.