SCHEDULE 3 Information required to be published

Assessment methods and quality control
5. In relation to each monitoring station, a narrative description of the method used to take fixed measurements of PM2.5 levels.
6. An explanation of how any equivalent methods used are equivalent to the reference method.
7. A description of any quality assurance and quality control systems used to ensure the continued accuracy of measuring devices and the data obtained from them.