PART 3

Free Allocation Regulation amended

Annex 7 amended (data monitoring methods)
21
1
Annex 7 is amended as follows.

Section 10 amended (rules for determining emissions at sub-installation level for the purpose of updating benchmark values)
2
In section 10.2 (attributed emissions to sub-installations) in the third paragraph for “and for flaring other than safety flaring” substitute “, for flaring other than safety flaring and for a regulated activity non-eligible for free allocation (see Article 2a(8))”.
Art. 21 in force at 1.1.2024, see art. 2(1)