. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Order revoked (13.3.2023) by The Pension Protection Fund and Occupational Pension Schemes (Levy Ceiling) (No. 2) Order 2023 (S.I. 2023/117), arts. 1(6), 6

Order revoked (13.3.2023) by The Pension Protection Fund and Occupational Pension Schemes (Levy Ceiling) (No. 2) Order 2023 (S.I. 2023/117), arts. 1(6), 6