SCHEDULE 9 Protective provisions

PART 3 For the protection of National Grid

Facilities and rights for alternative apparatus
32. (1) Where, in accordance with the provisions of this Part, the undertaker affords to or secures National Grid facilities and rights in land for the construction, use, maintenance and protection of alternative apparatus in substitution for apparatus to be removed, those facilities and rights must be granted upon such terms and conditions as may be agreed between the undertaker and National Grid and must be no less favourable on the whole to National Grid than the facilities and rights enjoyed by it in respect of the apparatus to be removed unless agreed by National Grid.
(2) If the facilities and rights to be afforded by the undertaker and agreed with National Grid under sub-paragraph (1) in respect of any alternative apparatus, and the terms and conditions subject to which those facilities and rights are to be granted, are less favourable on the whole to National Grid than the facilities and rights enjoyed by it in respect of the apparatus to be removed and the terms and conditions to which those facilities and rights are subject, the matter may be referred to arbitration under paragraph 39 (arbitration) and the arbitrator must make such provision for the payment of compensation by the undertaker to National Grid as appears to the arbitrator to be reasonable having regard to all the circumstances of the particular case. In respect of the appointment of an arbitrator under this sub-paragraph, article 44 (arbitration) applies.