SCHEDULE 10 Protective Provisions

PART 4 Protection for National Grid as electricity undertaker

10 Indemnity
(1) Subject to sub-paragraphs (2) and (3), if by reason or in consequence of the construction of any such works authorised by this Part of this Schedule or in consequence of the construction, use, maintenance or failure of any of the authorised works by or on behalf of the undertaker or in consequence of any act or default of the undertaker (or any person employed or authorised by him) in the course of carrying out such works, including without limitation works carried out by the undertaker under this Part of this Schedule or any subsidence resulting from any of these works, any damage is caused to any apparatus or alternative apparatus (other than apparatus the repair of which is not reasonably necessary in view of its intended removal for the purposes of the authorised works) or property of the statutory undertaker, or there is any interruption in any service provided, or in the supply of any goods, by the statutory undertaker, or the statutory undertaker becomes liable to pay any amount to any third party, the undertaker must—
(a) bear and pay on demand the cost reasonably incurred by the statutory undertaker in making good such damage or restoring the supply; and
(b) indemnify the statutory undertaker for any other expenses, loss, demands, proceedings, damages, claims, penalty or costs incurred by or recovered from the statutory undertaker, by reason or in consequence of any such damage or interruption or the statutory undertaker becoming liable to any third party as aforesaid other than arising from any default of the statutory undertaker.
(2) The fact that any act or thing may have been done by the statutory undertaker on behalf of the undertaker or in accordance with a plan approved by the statutory undertaker or in accordance with any requirement of the statutory undertaker or under its supervision does not (unless sub-paragraph (3) applies), excuse the undertaker from liability under the provisions of this sub-paragraph (1) unless the statutory undertaker fails to carry out and execute the works properly with due care and attention and in a skilful and workman like manner or in a manner that does not accord with the approved plan.
(3) Nothing in sub-paragraph (1) imposes any liability on the undertaker in respect of-
(a) any damage or interruption to the extent that it is attributable to the neglect or default of the statutory undertaker, its officers, servants, contractors or agents; and
(b) any authorised works and/or any other works authorised by this Part of this Schedule carried out by the statutory undertaker as an assignee, transferee or lessee of the undertaker with the benefit of the Order pursuant to section 156 of the Planning Act 2008 or article 5 (benefit of the Order) subject to the proviso that once such works become apparatus (“new apparatus”), any authorised works yet to be executed and not falling within this sub-paragraph (3)(b) will be subject to the full terms of this Part of this Schedule including this paragraph 10.
(4) The statutory undertaker must give the undertaker reasonable notice of any such third party claim or demand and no settlement or compromise must, unless payment is required in connection with a statutory compensation scheme, be made without first consulting the undertaker and considering their representations.
Sch. 10 Pt. 4 para. 10 in force at 22.4.2022, see art. 1(2)