3 Delay in expiry of section 43 of the Coronavirus Act 2020
Section 43 of the Coronavirus Act 2020 (statutory sick pay: power to disapply waiting period limitation: Northern Ireland)—
(a) does not expire at the time when it would otherwise expire, and
Section 43 of the Act would, without these Regulations, expire at the end of 24th March 2022 (see section 89 of the Act).
(b) instead expires at the end of the six month period beginning with 25th March 2022.