PART 3 England and Wales and Scotland

15 Opticians Act 1989
In section 27(3)(e) of the Opticians Act 1989 (requirements for sale and supply of optical appliances), for sub-paragraph (iii) substitute—

“(iii) has not been certified as sight-impaired or severely sight-impaired and in consequence registered as sight-impaired or severely sight-impaired in a register maintained by or on behalf of the Department of Health in Northern Ireland.”

.
1989 c. 44, to which there are amendments not relevant to this Order.