Amendment of Schedule 10
17
1
Schedule 10 (optional testing after arrival in England) is amended as follows.
2
In paragraph 4 (required circumstances for undertaking testing)—
a
omit sub-paragraph (ba) ;
b
in sub-paragraph (c)—
i
in the opening words, omit “or (ba)”;
ii
in paragraph (i), omit “and (ba)”.
3
In paragraph 5 (notification of test results)—
a
in the opening words of sub-paragraph (2), for “within 24 hours of the result becoming available” substitute “ within 48 hours of the time when the sample taken for the purposes of the test is received by the diagnostic laboratory ”;
b
in sub-paragraph (6), omit paragraph (ba).
Sub-paragraph (ba) was inserted by S.I. 2021/914.
Reg. 17(1)(2)(3)(b) in force at 30.8.2021 at 4.00 a.m., see reg. 1(2)
Reg. 17(3)(a) in force at 21.9.2021, see reg. 1(4)