PART 7

Training, qualifications and medical fitness
CHAPTER 3

Training manual

Approval of the training manual
67
1
The regulator may only approve sections of a training manual under regulation 66(1)(b) if it is satisfied that the sections of the training manual referred to in regulation 66(1)(b)—
a
comply with the requirements set out in Part 2 of Schedule 3, and
b
are fit for their purpose.
2
In determining whether the requirement in paragraph (1)(b) is satisfied, the regulator must take into account—
a
the scope, structure and content of the relevant sections of the training manual,
b
any material referred to in those sections of the training manual, and
c
how applicable those sections of the training manual are to the licensed activities.
Reg. 67 in force at 29.7.2021, see reg. 1(1)