PART 3

Monitoring, reporting and verification (“MRV”) of aeroplane operator annual CO2 emissions
CHAPTER 4

Verification of CO2 emissions

Verification of sustainable aviation fuels
36
1
Fuel purchases, transaction reports, fuel blending records and sustainability credentials must constitute the documentary proof for the purpose of verification and approval of emissions reductions from the use of CORSIA eligible fuels.
2
An aeroplane operator must ensure that it, or its designated representative, has audit rights over the production records for the CORSIA eligible fuels that it purchases .
The quality control assurances of CORSIA eligible fuel producers include declarations and/or process certifications, with periodic audits by verifiers, purchasers, or trusted entities. The process certifications, including the sustainability credentials, provide assurance that the CORSIA eligible fuel producer has established business processes to prevent double counting, and the periodic audits verify that the producer is following their established procedures. Purchasers and States may elect to independently audit the production records of the CORSIA eligible fuel producer in order to provide further assurance.
Art. 36 in force at 26.5.2021, see art. 1