PART 3

Monitoring, reporting and verification (“MRV”) of aeroplane operator annual CO2 emissions
CHAPTER 2

Monitoring of aeroplane operator annual CO2 emissions

Emissions Monitoring Plan
23
1
An aeroplane operator must submit an Emissions Monitoring Plan to the Regulator for approval by the Regulator. The Emissions Monitoring Plan must contain the information set out in Schedule 4.
2
Where an aeroplane operator has, prior to this Order coming into force, established an approved Emissions Monitoring Plan pursuant to article 3 of Commission Implementing Regulation (EU) 2019/1603 , a Regulator must, before 30th June 2021, approve and issue an Emissions Monitoring Plan to that aeroplane operator in the same terms, subject to any variation required to comply with this Order.
3
A new entrant aeroplane operator must submit an Emissions Monitoring Plan to the Regulator for approval and issue within 3 months of falling within the scope of applicability set out in article 21. The Emissions Monitoring Plan must contain the information specified in Schedule 4.
OJ L 250, 30.9.2019, p.10.
Art. 23 in force at 26.5.2021, see art. 1