Statutory Instruments
2021 No. 25
Public Health, England
Transport, England
The Health Protection (Coronavirus, International Travel) (England) (Amendment) (No. 2) Regulations 2021
Made 11th January 2021
Coming into force at 4.00 a.m. on 12th January 2021
Laid before Parliament at 11.30 a.m. on 12th January 2021

The Secretary of State makes the following Regulations in exercise of the powers conferred by sections 45B, 45F(2) and 45P(2) of the Public Health (Control of Disease) Act 1984.
1984 c. 22. Part 2A was inserted by section 129 of the Health and Social Care Act 2008 (c. 14).

Citation, commencement and interpretation
1. (1) These Regulations may be cited as the Health Protection (Coronavirus, International Travel) (England) (Amendment) (No. 2) Regulations 2021 and come into force at 4.00 a.m. on 12th January 2021.
(2) In these Regulations, “the International Travel Regulations” means the Health Protection (Coronavirus, International Travel) (England) Regulations 2020.
S.I. 2020/568, amended by S.I. 2020/691, 724, 799, 805, 813, 819, 841, 866, 890, 913, 959, 980, 1013, 1039, 1070, 1076, 1094, 1129, 1161, 1190, 1227, 1238, 1277, 1292, 1323, 1337, 1360, 1424, 1517, 1595, 1644 and S.I. 2021/18.

Amendment of the International Travel Regulations
2. (1) The International Travel Regulations are amended as follows.
(2) In Part 1 of Schedule A1 (exempt countries and territories) omit the entry for “United Arab Emirates”.

Transition and saving provision
3. In relation to any person who arrived in England on or after 10th July 2020 but before 4.00 a.m. on 12th January 2021, the International Travel Regulations apply as if the amendment made by regulation 2(2) had not been made.
Signed by authority of the Secretary of State for Transport
Robert Courts
Parliamentary Under Secretary of State
Department for Transport
11th January 2021

EXPLANATORY NOTE
(This note is not part of the Regulations)
These Regulations amend the Health Protection (Coronavirus, International Travel) (England) Regulations 2020 (S.I. 2020/568) (“the International Travel Regulations”) to remove the United Arab Emirates from the list of exempt countries and territories in Schedule A1 to the International Travel Regulations, from which passengers arriving in England are not required to self-isolate.
Passengers are not required to self-isolate on arrival in England if, during the 10 days preceding their arrival, they have only been in or transited through exempt countries or territories, or exempt parts of countries or territories. Passengers who have been in or transited through a non-exempt country or territory, or a non-exempt part of a country or territory, must self-isolate until 10 days have elapsed since the day after they last left a non-exempt country or territory, or a non-exempt part of a country or territory. The change to Schedule A1 will not affect passengers who arrive in England before 4.00 a.m. on 12th January 2021.
An impact assessment has not been produced for this instrument. An explanatory memorandum has been published alongside this instrument at www.legislation.gov.uk.