Amendment to Schedule 8
9
1
Schedule 8 is amended as follows.
2
In paragraph 1(1)(d)(ii), for “7, 7B, 10, 11 and 11A” substitute “7, 10 and 11”.
3
In paragraph 3, after sub-paragraph (2) insert—
2A
Where P has received a notification in the form of Form B or Form D in paragraph 11(3), regulation 2A, apart from paragraphs (2)(a) and (3)(a), of the Self-Isolation Regulations apply to P.
.
4
Omit paragraphs 7A and 7B.
5
In paragraph 10—
a
omit sub-paragraph (3)(b);
b
omit sub-paragraph (3C);
c
in sub-paragraph (4)(a), omit “and (3C)”.
6
In paragraph 11—
a
in sub-paragraph (1), omit “, other than a day 2 LFD test”;
b
in sub-paragraph (3), at the end insert—
- Form D: suspected positive result with Omicron variant
- Your coronavirus test result is positive. You are therefore required to self-isolate for 10 full days after the date on which you first developed symptoms or, if you did not have symptoms, the date on which you took the test.
- Your positive COVID test has been identified as a suspected Omicron variant.
- You will be contacted shortly by NHS Test and Trace to obtain details of your household and close contacts, and to confirm your self-isolation period. Your household and close contacts will be required to self-isolate for 10 days, regardless of age and vaccination status.
- You must not travel, including to leave the UK, during self-isolation.
- Contact 111 if you need medical help. In an emergency dial 999.
.
7
Omit paragraph 11A.
Relevant amendments to Schedule 8 were made by S.I. 2021/966 and 2021/1179.