5 Conditions on exemptions
The exemption granted by article 3(b) of this Order is subject to compliance with the following conditions—
(a) Rookery South Energy Recovery Facility is connected to the total system;
(b) Rookery South Energy Recovery Facility does not export more than 100 megawatts of electrical power to the total system, except in circumstances outside the reasonable control of Rookery South Limited; and
(c) Rookery South Limited is not a licensed generator.