SCHEDULE

“SCHEDULE 1A UK TPE marking
Regulation 22B(2)
1 The UK TPE marking consists of the Greek letter “rho” taking the following form—
2 Where the marking is reduced or enlarged, the proportions given in the graduated drawing in paragraph 1 must be respected.
3 The grid does not form part of the marking.
4 Subject to paragraph 5, the marking must be at least 5 millimetres high.
5 For UK TPE with a diameter less than or equal to 140 millimetres, the minimum height shall be 2.5 millimetres.”

Regulation 22(2)