. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (14.10.2020) by The Health Protection (Coronavirus, Local COVID-19 Alert Level) (High) (England) Regulations 2020 (S.I. 2020/1104), reg. 1(2), Sch. 3 para. 4(1)(d) (with reg. 9, Sch. 3 para. 5(2))