SCHEDULE 7 Amendment of an authorisation under Article 60(4) of the REACH Regulation
1 Commission Implementing Decision C(2017) 3439 granting an authorisation for a use of chromium trioxide under REACH (Rimex Metals (UK) Ltd) is amended in accordance with this Schedule.