PART 3 Amendment of retained direct EU legislation

133
In Article 4(2), for “Commission” substitute “ Food Safety Authority ”.
Reg. 133 in force at 31.12.2020 on IP completion day (in accordance with 2020 c.1, Sch. 5 para. 1(1)), see reg. 1