PART 2 Amendment of primary legislation

74
In section 146 (standard conditions for electricity interconnectors), in subsection (5), omit “under section 2(2) of the European Communities Act 1972,”.
Reg. 74 in force at 31.12.2020 on IP completion day (in accordance with 2020 c. 1, Sch. 5 para. 1(1)), see reg. 1(1)