2019 No. 483
Exiting The European Union
Human Tissue
The Quality and Safety of Organs Intended for Transplantation (Amendment) (EU Exit) Regulations 2019
Made 5th March 2019
Coming into force in accordance with regulation 1

The Secretary of State makes these Regulations in exercise of the powers conferred by sections 8(1) and 23(1) of the European Union (Withdrawal) Act 2018.
2018 c. 16.
In accordance with paragraph 1(1) of Schedule 7 to that Act, a draft of this instrument has been laid before Parliament and approved by a resolution of each House of Parliament.