SCHEDULES

SCHEDULE 2 Designated controlled sites
Article 3
	Remains of vessels concerned	Area designated as controlled site	Latitude of relevant point	Longitude of relevant point
(a)	HMS Affray	Area situated within 400 metres from the relevant point	49°50.023′N.	02°34.533′W.
(b)	HMS A7	Area situated within 200 metres from the relevant point	50°18.518′N.	04°17.984′W.
(c)	HMS Bulwark	Area situated within 100 metres from the relevant point	51°25.392′N.	00°39.172′E.
(d)	HMS B2	Area situated within 300 metres from the relevant point	51°07.153′N.	01°27.587′E.
(e)	HMS Dasher	Area situated within 200 metres from the relevant point	55°37.747′N.	05°00.953′W.
(f)	HMS Exmouth	Area situated within 750 metres from the relevant point	58°18.467′N.	02°28.938′W.
(g)	HMS Formidable	Area situated within 400 metres from the relevant point	50°13.179′N.	03°04.071′W.
(h)	HMS Hampshire	Area situated within 300 metres from the relevant point	59°07.065′N.	03°23.843′W.
(i)	HMS H5	Area situated within 300 metres from the relevant point	53°05.483′N.	04°41.975′W.
(j)	HMS Natal	Area situated within 100 metres from the relevant point	57°41.244′N.	04°05.310′W.
(k)	HMS Royal Oak	Area situated within 200 metres from the relevant point	58°55.848′N.	02°59.001′W.
(l)	HMS Vanguard	Area situated within 200 metres from the relevant point	58°51.400′N.	03°06.405′W.
(m)	the UB-81	Area situated within 250 metres from the relevant point	50°29.442′N.	00°58.351′W.