3 Transitional provision
Section 67A of the Regulation of Investigatory Powers Act 2000 (appeals from the Tribunal) does not apply to any determination or decision of the Investigatory Powers Tribunal made before 31st December 2018.
2000 c. 23. Section 67A is inserted by section 242 of the Investigatory Powers Act 2016.