SCHEDULE 3

National emission ceilings and national emission reduction commitments
Regulation 5 & 6
Table 1

National emission ceilings to be achieved in each of 2018 and 2019
The amount specified for the purpose of regulation 5(1) is the relevant figure shown in the table below less the emissions of that pollutant from Gibraltar in the relevant year.
SO2 Kilotonnes | NOx Kilotonnes | NMVOC Kilotonnes | NH3 Kilotonnes
585 | 1167 | 1200 | 297
Table 2

National reduction commitments in 2020 and in each subsequent year up to and including 2029
The figures show the percentage reductions to be made for the purpose of regulation 6(2).
SO2 | NOx | NMVOC | NH3 | PM 2.5
59% | 55% | 32% | 8% | 30%
Table 3

National reduction commitments in 2030 and in each subsequent year
The figures show the percentage reductions to be made for the purpose of regulation 6(3).
SO2 | NOx | NMVOC | NH3 | PM 2.5
88% | 73% | 39% | 16% | 46%
Word in Sch. 3 substituted (10.12.2020) by The Environment (Miscellaneous Amendments) (EU Exit) Regulations 2020 (S.I. 2020/1313), regs. 1(2), 3