SCHEDULE INSTALLATIONS

PART 1 Installations stationed at the time the Order is made
(1) Name or other designation	(2) Latitude	(3) Longitude
Orlando Subsea Wellhead 3/3b-13y, Block 3/3b, Orlando Field	60°56.671’N	01°33.685’E
Garten well 9/18a-40, Block 9/18a, Beryl Field	59°29.42’N	01°33.32’E
Murdoch (KM) subsea wellhead, Block 44/21a, Murdoch Field	54°14.246’N	02° 23.301’E
Boulton (HM) subsea wellhead, Block 44/22b, Boulton H Field	54°11.311’N	02°12.563’E