PART 2 Amendment of the Environmental Permitting (England and Wales) Regulations 2016

6 Regulation 8 (interpretation: regulated facility)
In regulation 8 (interpretation: regulated facility)—
(a) after paragraph (1)(j) insert—

“(k) a medium combustion plant;
(l) a specified generator”

,
(b) after paragraph (4)(g) insert—

“(h) a medium combustion plant;
(i) a specified generator”

.