PART 2

Appointment, Suspension and Dismissal of the Chief Fire Officer
CHAPTER 1

Appointment

Next steps if veto
10
1
This article applies if the relevant police and crime panel vetoes the appointment of a candidate.
2
The Authority must not appoint that candidate as the chief fire officer.
Art. 10 in force at 1.10.2017, see art. 1(1)
Arts. 3-23 applied (26.6.2020) by S.I. 2017/469, Sch. para. 6 (as inserted by The Greater Manchester Combined Authority (Fire and Rescue Functions) (Amendment) Order 2020 (S.I. 2020/641), arts. 1, 9)
Arts. 3-23 modified (20.12.2023) by The York and North Yorkshire Combined Authority Order 2023 (S.I. 2023/1432), arts. 1(2), 46(2), Sch. 7 para. 15