PART 3 National Insurance Funds

9 Prescribed percentage of estimated benefit expenditure – Great Britain
Section 2(2) of the Social Security Act 1993 (payments into National Insurance Fund out of money provided by Parliament) has effect with respect to the tax year 2017-18 and the prescribed percentage of estimated benefit expenditure for the financial year ending with 31st March in that tax year shall be 5 per cent.