SCHEDULE

Designated Bodies
Article 2
PART 1

Ministry of Defence
- Advisory Committee on Conscientious Objectors
- Advisory Group on Military Medicine
- Armed Forces Pay Review Body
- Central Advisory Committee on Pensions and Compensation
- Commonwealth War Graves Commission
- Defence Nuclear Safety Committee
- Defence Scientific Advisory Council
- Independent Monitoring Board for the Military Corrective Training Centre (MCTC) Colchester
- National Army Museum
- National Employer Advisory Board
- National Museum of the Royal Navy
- Nuclear Research Advisory Council
- Royal Air Force Museum
- Royal Hospital Chelsea
- Science Advisory Committee on the Medical Implications of Less-Lethal Weapons
- Single Source Regulations Office
- Territorial, auxiliary and volunteer reserve associations established under section 110 of the Reserve Forces Act 1996
- Veterans Advisory and Pensions Committees
PART 2

Home Office
- The Advisory Council on the Misuse of Drugs
- Animals in Science Committee
- College of Policing
- Disclosure and Barring Service
- Gangmasters and Labour Abuse Authority
- Her Majesty’s Inspectorate of Constabulary
- Immigration Services Commissioner
- Independent Family Returns Panel
- Independent Office for Police Conduct
- Investigatory Powers Commissioner’s Office
- Investigatory Powers Tribunal
- Migration Advisory Committee
- National Crime Agency Remuneration Review Body
- National
DNA
Database Ethics Group
- Office of Surveillance Commissioners
- Office of the Chief Inspector of the
UK
Border Agency
- The Office of the Commissioner for the Retention and Use of Biometric Material
- The Office of the Forensic Science Regulator
- The Office of the Independent Anti-Slavery Commissioner
- The Office of the Independent Monitor for the purposes of Part 5 of the Police Act 1997
- The Office of the Independent Reviewer of Terrorism Legislation
- Office of the Intelligence Services Commissioner
- Office of the Interception of Communications Commissioner
- The Office of the person appointed under sections 47H(4), 127H(4), 195H(4) and 290(8) of the Proceeds of Crime Act 2002
- The Office of the Surveillance Camera Commissioner
- Police Advisory Board for England and Wales
- Police Discipline Appeals Tribunal
- Police Remuneration Review Body
- Security Industry Authority
- Technical Advisory Board
PART 3

Foreign and Commonwealth Office
- The Great Britain-China Centre
- Marshall Aid Commemoration Commission
- The
UK
China Forum
- The Westminster Foundation for Democracy Limited
PART 4

Department for International Development
- Commonwealth Scholarship Commission in the United Kingdom
- The Independent Commission for Aid Impact
PART 5

Department of Health
- Administration of Radioactive Substances Advisory Committee
- Advisory Committee on Antimicrobial Prescribing, Resistance and Healthcare Associated Infection
- Advisory Committee on Borderline Substances
- Advisory Committee on Clinical Excellence Awards
- Advisory Committee on Dangerous Pathogens
- Advisory Committee on the Safety of Blood, Tissues and Organs
- Advisory Group on Hepatitis
- Care Quality Commission
- Charitable trusts the trustees of which are an
NHS
Foundation Trust (as established under section 30 of the National Health Service Act 2006
)
- Charitable trusts the trustees of which are appointed for
NHS
Foundation Trusts in pursuance of an order under section 51 of the National Health Service Act 2006
- Clinical commissioning groups (as established under section 14D of the National Health Service Act 2006)
- Committee on Carcinogenicity of Chemicals in Food, Consumer Products and the Environment
- Committee on the Medical Aspects of Radiation in the Environment
- Committee on the Medical Effects of Air Pollutants
- Committee on Mutagenicity of Chemicals in Food, Consumer Products and the Environment
- Community Health Partnerships Ltd
- English
NHS
charities as defined by section 149(7) of the Charities Act 2011
- Expert Advisory Group on
AIDS
- Genomics England Limited
- Health and Care Professions Council
- The Health and Social Care Information Centre
- Health Education England
- Health Research Authority
- Healthwatch England
- Human Fertilisation and Embryology Authority
- Human Tissue Authority
- Independent Reconfiguration Panel
- Joint Committee on Vaccination and Immunisation
- Monitor
- The National Health Service Commissioning Board
- National Health Service Trust Development Authority
- National Institute for Health and Care Excellence
- NHS
Business Services Authority
- NHS
Counter Fraud Authority
- NHS
Foundation Trusts (as established under section 30 of the National Health Service Act 2006)
- NHS
Litigation Authority
- The
NHS
Pay Review Body
- NHS
Property Services Ltd
- NHS
Trusts (as established under section 25 of the National Health Service Act 2006)
- The Nursing and Midwifery Council
- Professional Standards Authority for Health and Social Care
- Review Body on Doctors’ and Dentists’ Remuneration
- Scientific Advisory Committee on Nutrition
- Skipton Fund Ltd
- Wiltshire Health and Care
LLP
PART 6

Department for Work and Pensions
- BPDTS Limited
- Disabled People’s Employment Corporation (GB) Ltd
- Health and Safety Executive
- Industrial Injuries Advisory Council
- Ombudsman for the Board of the Pension Protection Fund
- The Pensions Advisory Service Limited
- The Pensions Ombudsman
- The Pensions Regulator
- Remploy Pension Scheme Trustees Ltd
- Social Security Advisory Committee
PART 7

Department for Education
- Aggregator Vehicle
PLC
- Children’s Commissioner
- Commission for Equality and Human Rights
- The Construction Industry Training Board (established under the Industrial Training Act 1964)
- Engineering Construction Industry Training Board
- Film Industry Training Board for England and Wales
- Higher Education Funding Council for England
- The Institute for Apprenticeships
- Located Property Limited
- Office for Fair Access
- Office for Students
- School Teachers’ Review Body
- Social Mobility and Child Poverty Commission
- Student Loans Company Limited
PART 8

Department for Business, Energy and Industrial Strategy
- Advisory, Conciliation and Arbitration Service
- AEA Insurance Ltd
- Aerospace Technology Institute
- The Arts and Humanities Research Council
- Aviva Investors Realm Energy Centres Limited Partnership
- The Biotechnology and Biological Sciences Research Council
- BIS (Postal Services Act 2011) Company Limited
- British Business Aspire Holdco Ltd
- British Business Bank plc
- British Business Bank Investments Ltd
- British Business Finance Ltd
- British Business Financial Services Ltd
- British Hallmarking Council
- Capital for Enterprise Fund Managers Limited
- Capital for Enterprise (
GP
) Limited
- Capital for Enterprise Limited
- Central Arbitration Committee
- Certification Office for Trade Union and Employers’ Associations
- Civil Nuclear Police Authority
- Coal Authority
- Committee on Climate Change
- Committee on Fuel Poverty
- Committee on Radioactive Waste Management
- Competition Appeal Tribunal
- Competition Service
- The Copyright Tribunal
- Cornwall and Isles of Scilly Investments Limited
- Council for Science and Technology
- Daresbury Science & Innovation Campus Limited
- Daresbury SIC (PubSec)
LLP
- Diamond Light Source Limited
- Dounreay Site Restoration Limited
- East Midlands Early Growth Fund Limited
- The Economic and Social Research Council
- Electricity Settlements Company Ltd
- Energy Saving Investments L.P.
- The Engineering and Physical Sciences Research Council
- Enrichment Holdings Ltd
- Enrichment Investments Limited
- Fleetbank Funding Limited
- The Financial Reporting Council Limited
- GLID Wind Farms TopCo Limited
- Green Investment Bank Offshore Wind Fund LP
- Groceries Code Adjudicator
- Harwell Science and Innovation Campus Public Sector Limited Partnership
- Industrial Development Advisory Board
- LLW Repository Limited
- Low Carbon Contracts Company Ltd
- Low Pay Commission
- Lyle JV Holdings Limited
- Magnox Limited
- Medical Research Council
- Midlands Engine Investments Limited
- The Natural Environment Research Council
- NDA
Archives Limited
- The NESTA Trust
- Northern Powerhouse Investments Limited
- Nuclear Decommissioning Authority
- Nuclear Liabilities Financing Assurance Board
- NW VCLF HF
LLP
- Office of Manpower Economics
- Oil and Gas Authority
- Postal Services Holding Company Limited
- Pubs Code Adjudicator
- Radioactive Waste Management Limited
- The Recycling and Waste L.P.
- Regulatory Policy Committee
- Research Sites Restoration Limited
- The Science and Technology Facilities Council
- Sellafield Limited
- Small Business Commissioner
- South Tees Site Company Limited
- The Start-Up Loans Company
- STFC Innovations Limited
- The Technology Strategy Board
- UK
Climate Investments Indigo Limited
- UK
Climate Investments
LLP
- UK
Climate Investments VC Limited
- UK
Energy Efficiency Investments 1 L.P.
- UK
Green Community Lending Ltd
- UK
Green Infrastructure Platform Limited
- UK
Green Investment Bank Financial Services Limited
- UK
Green Investment Bank Limited
- UK
Green Investment Climate International Limited
- UK
Green Investment Co-investment Lyle Limited
- UK
Green Investment FCG Limited
- UK
Green Investment Gwynt y Mor Limited
- UK
Green Investment LID Limited
- UK
Green Investment Lyle Limited
- UK
Green Investment Rampion Limited
- UK
Green Investment Rhyl Flats Limited
- UK
Green Investment Offshore Wind B L.P.
- UK
Green Investment Offshore Wind C L.P.
- UK
Green Investment Offshore Wind Co-Investment L.P.
- UK
Green Investment (OSW)
GP
Limited
- UK
Green Investment OSWF Lyle Limited
- UK
Green Investment Sheringham Shoal Limited
- UK
Green Sustainable Waste and Energy Investments L.P.
- UK
Shared Business Services Limited
- UK
Waste Resources and Energy Investments L.P.
- United Kingdom Atomic Energy Authority
PART 9

Department for Transport
- Air Safety Support International Ltd
- Air Travel Trust
- British Transport Police Authority
- The Commissioners of Irish Lights
- The Commissioners of Northern Lighthouses
- CTRL Section 1 Finance Plc
- Directly Operated Railways
- Disabled Persons Transport Advisory Committee
- High Speed Two (HS2) Limited
- Highways England Company Ltd
- LCR Finance Plc
- Network Rail Limited
- Passengers’ Council
- Trinity House Lighthouse Service
PART 10

Department for Digital, Culture, Media and Sport
- Advisory Committee on the Government Art Collection
- Arts Council of England
- Arts Council of England Lottery
- BBC
- BBC
Commercial Holdings Limited
- BBC
Digital Programme Services Limited
- BBC
Free to View (Satellite) Ltd
- BBC
Free to View Ltd
- BBC
Global News Holdings Limited
- BBC
Investments Ltd
- BBC
Media Applications Technologies Limited
- BBC
News Ltd
- BBC
Property Development Ltd
- BBC
Property Investment Ltd
- BBC
Property Ltd
- BBC
Subscription Television Limited
- BBC
Ventures Group Limited
- BBC
World Service Holdings Ltd
- BIG Lottery Fund
- British Film Institute
- British Film Institute Lottery
- British Library
- British Museum
- British Tourist Authority
- Churches Conservation Trust
- DSHS Ltd
- The English Institute of Sport Limited
- The English Sports Council
- The English Sports Council Lottery
- English Sports Development Trust Limited
- Gambling Commission
- Geffrye Museum Trust Ltd
- Heritage Lottery Fund
- The Historic Buildings and Monuments Commission for England
- The Historic England Foundation
- Historic England Limited
- Horniman Museum and Public Park Foundation
- Horniman Public Museum and Public Park Trust
- Horserace Betting Levy Board
- Imperial War Museum
- Information Commissioner
- National Film Development Fund
- National Gallery
- National Heritage Memorial Fund
- National Maritime Museum
- National Museums Liverpool
- National Portrait Gallery
- Natural History Museum
- The Natural History Museum Benevolent Fund
- The Natural History Museum Special Funds Trust
- Office of the Adjudicator – Broadcast Transmission Services
- The Office of the Adjudicator Ltd
- Office of Communications
- Phone-paid Services Authority Limited
- PhonepayPlus Limited
- Reviewing Committee on the Export of Works of Art
- Royal Armouries Development Trust
- Royal Armouries Museum
- S4C
- Science Museum Group
- Sir John Soane’s Museum
- The Sports Council Trust Company
- Sports Grounds Safety Authority
- Tate Gallery
- Tate Gallery Projects Limited
- Tech City (
UK
) Limited
- Treasure Valuation Committee
- UK
Anti-Doping
- The United Kingdom Sports Council
- The United Kingdom Sports Council Lottery
- Victoria and Albert Museum
- Wallace Collection
- Yorkshire 2019 Limited
PART 11

Department for Communities and Local Government
- AWM (Subsidiary) Ltd
- Bristol and Bath Science Park Estate Management Company Limited
- Building Regulations Advisory Committee
- Commission for Local Administration in England
- The Ebbsfleet Development Corporation
- English Partnerships (LP) Limited
- The Estuary Management Company Ltd
- Homes and Communities Agency
- The Housing Ombudsman
- The Leasehold Advisory Service
- NorwePP (NWDA Subsidiary) Limited
- ONE NorthEast General Partner Limited
- Valuation Tribunal for England
- Valuation Tribunal Service
PART 12

Ministry of Justice
- Advisory Committees on Justices of the Peace in England and Wales
- Assessor of Compensation for Miscarriages of Justice
- Chief Coroner’s Office
- Children and Family Court Advisory and Support Service
- Civil Justice Council
- Civil Procedure Rule Committee
- Criminal Cases Review Commission
- Criminal Procedure Rule Committee
- Family Justice Council
- Family Procedure Rule Committee
- Independent Advisory Panel on Deaths in Custody
- Independent Monitoring Boards of Prisons, Immigration Removal Centres and Short Term Holding Facilities
- Judicial Appointments and Conduct Ombudsman
- Judicial Appointments Commission
- Judicial College
- Judicial Conduct and Investigations Office
- Judicial Office
- Law Commission
- Legal Services Board
- Office for Legal Complaints
- Office of the Commissioner for Victims and Witnesses
- Office of
HM
Inspectorate of Prisons
- Office of
HM
Inspectorate of Probation
- Office of the Judge Advocate General
- Office of the Official Solicitor
- Office of the Prisons and Probation Ombudsman for England and Wales
- Parole Board for England and Wales
- Prison Service Pay Review Body
- Public Trustee
- Sentencing Council for England and Wales
- Tribunal Procedure Committee
- Youth Justice Board for England and Wales
PART 13

Department for Environment, Food and Rural Affairs
- Advisory Committee on Releases to the Environment
- Agriculture and Horticulture Development Board
- Consumer Council for Water
- Environment Agency
- Flood Re
- Forestry Commission
- Independent Agricultural Appeals Panel
- Joint Nature Conservation Committee
- Marine Management Organisation
- Meat and Livestock Commercial Services Limited
- National Forest Company
- Natural England
- Plant Varieties and Seeds Tribunal
- RBG Kew Enterprises Limited
- Royal Botanic Gardens, Kew
- Science Advisory Council
- Sea Fish Industry Authority
- Sutton Bridge Experimental Unit Limited
- Veterinary Products Committee
PART 14

HM Revenue and Customs
- Revenue & Customs Digital Technology Services Limited
PART 15

HM Treasury
- Aire Valley Funding 1 Limited
- Aire Valley Funding 2 Limited
- Aire Valley Holdings Limited
- Aire Valley Mortgage 2004-1 plc
- Aire Valley Mortgage 2005-1 plc
- Aire Valley Mortgage 2006-1 plc
- Aire Valley Mortgage 2007-1 plc
- Aire Valley Mortgage 2007-2 plc
- Aire Valley Mortgage 2008-1 plc
- Aire Valley PECOH Limited
- Bradford and Bingley plc
- Bradford & Bingley Covered Bonds
LLP
- Bradford & Bingley Homeloans Limited
- Bradford & Bingley Investments
- Bradford & Bingley Mortgage Management Limited
- Community Housing Initiatives Limited
- Designated Member
No.
1 Limited
- Designated Member
No.
2 Limited
- F&NE (1990) Limited
- F&NE Limited
- FFM Limited
- Finance for Mortgages Limited
- Financial Reporting Advisory Board
- Financial Services Compensation Scheme
- GPCH Limited
- Granite Finance Funding Limited
- Granite Finance Funding 2 Limited
- Granite Finance Holdings Limited
- Granite Finance Trustees Limited
- Granite Master Issuer plc
- Granite Mortgages 03-2 plc
- Granite Mortgages 03-3 plc
- Granite Mortgages 04-1 plc
- Granite Mortgages 04-2 plc
- Granite Mortgages 04-3 plc
- Help to Buy (HMT) Limited
- Heron’s Reach Developments Limited
- HM
Treasury
UK
Sovereign Sukuk Plc
- HSMS
- Infrastructure Finance Unit Limited
- IUK Investments Holdings Limited
- IUK Investments Limited
- Ivybond Holdings Limited
- Leamington Mortgage Corporation Limited
- Money Advice Service
- Moore Investments Limited
- Mortgage Express
- Mortgage Express (No.2)
- Mortgage Express Holdings
- Northern Rock (Asset Management) Limited
- NRAM Limited
- NRAM (No.2) Limited
- NRAM Covered Bond
LLP
- NRAM Homes Limited
- Office for Budget Responsibility
- Royal Household
- Royal Mint Advisory Committee on the Design of Coins, Medals, Seals and Decorations
- Scotlife Homeloans (No.2) Limited
- Silhouette Mortgages Limited
- UK
AR
Corporate Services Limited
- UK
Asset Resolution Ltd
- UK
Financial Investments Ltd
- UKGI Financing plc
- UK
Government Investments Limited
- Whinstone Capital Management Limited
- Whinstone 2 Capital Management Limited
PART 16

Cabinet Office
- Advisory Committee on Business Appointments
- Civil Service Commission
- Committee on Standards in Public Life
- House of Lords Appointments Commission
- Main Honours Committee
- Office of the Commissioner for Public Appointments
- Parliamentary Boundary Commission for England
- Parliamentary Boundary Commission for Wales
- The Registrar of Consultant Lobbyists
- Security Vetting Appeals Panel
- Senior Salaries Review Body
PART 17

Scotland Office and Office of the Advocate General
- Boundary Commission for Scotland
PART 18

Northern Ireland Office
- Boundary Commission for Northern Ireland
- Independent Reporting Commission
- Northern Ireland Human Rights Commission
- Parades Commission for Northern Ireland
PART 19

Food Standards Agency
- Advisory Committee on Animal Feedingstuffs
- Advisory Committee on Novel Foods and Processes
- Advisory Committee on the Microbiological Safety of Food
- Committee on Toxicity of Chemicals in Food, Consumer Products and the Environment
- FSA Science Council
- Social Science Research Committee
PART 20

The National Archives
- Advisory Council on National Records and Archives
PART 21

Export Credits Guarantee Department
- Export Guarantees Advisory Council
1997 c.50. The independent monitor is appointed under section 119B of the Police Act 1997. Section 119B was inserted by section 28 of the Safeguarding Vulnerable Groups Act 2006 (c.47).
The Independent Reviewer of Terrorism Legislation is appointed under section 36 of the Terrorism Act 2006 (c.11).
2002 c.29. Sections 47H, 127H and 195H were inserted respectively by sections 55(2), 56(2) and 57(2) of the Policing and Crime Act 2009 (c.26).
2006 c.41.
Section 14D was inserted by section 25(1) of the Health and Social Care Act 2012 (c.7).
2011 c.25. Paragraphs (ba) to (bd) of section 149(7) were inserted by paragraph 184(c) of Schedule 5 to the Health and Social Care Act 2012.
1964 c.16. The Board was established by order (S.I. 1964/1079) made under section 1 of the Industrial Training Act 1964. The Industrial Training Act 1964 was repealed by Schedule 4 to the Industrial Training Act 1982 (c.10) and that Act now makes provision about the Board’s functions.
Sch. substituted (31.1.2018) by The Government Resources and Accounts Act 2000 (Estimates and Accounts) (Amendment) Order 2017 (S.I. 2017/1256), art. 1(2), Sch.