SCHEDULE

Designated Bodies
PART 7

Department for Education
- Aggregator Vehicle
PLC
- Children’s Commissioner
- Commission for Equality and Human Rights
- The Construction Industry Training Board (established under the Industrial Training Act 1964)
- Engineering Construction Industry Training Board
- Film Industry Training Board for England and Wales
- Higher Education Funding Council for England
- The Institute for Apprenticeships
- Located Property Limited
- Office for Fair Access
- Office for Students
- School Teachers’ Review Body
- Social Mobility and Child Poverty Commission
- Student Loans Company Limited
1964 c.16. The Board was established by order (S.I. 1964/1079) made under section 1 of the Industrial Training Act 1964. The Industrial Training Act 1964 was repealed by Schedule 4 to the Industrial Training Act 1982 (c.10) and that Act now makes provision about the Board’s functions.
Sch. substituted (31.1.2018) by The Government Resources and Accounts Act 2000 (Estimates and Accounts) (Amendment) Order 2017 (S.I. 2017/1256), art. 1(2), Sch.