SCHEDULES

SCHEDULE 9 PROTECTION OF INTERESTS

PART 7 FOR THE PROTECTION OF THAMES WATER

82 Iver South Sludge Dewatering Centre
(1) The undertaker must not in the exercise of the powers conferred by this Order unreasonably prevent Thames Water’s access over plots 26-11 and 26-12 shown on the land plans and listed in the book of reference.
(2) Not less than 56 days prior to undertaking any works in connection with Work No. 25 (including traffic management measures, diversions, road closures and stopping up) that would affect Thames Water’s access over plots 26-11 and 26-12 the undertaker must submit to Thames Water details of the proposed location and duration of those works and must comply with its reasonable requirements for ensuring its continued access over plots 26-11 and 26-12.