2016 No. 779

Infrastructure Planning

The Meaford Gas Fired Generating Station Order 2016
Made
19th July 2016
Coming into force
2nd August 2016
An application under section 37 of the Planning Act 2008 (the “2008 Act”) has been made to the Secretary of State for an order granting development consent.
The application has been examined by a single appointed person, who has made a report to the Secretary of State under section 83(1) of the 2008 Act.
The Secretary of State has considered the report and recommendation of the single appointed person, has taken into account the environmental information in accordance with regulation 3 of the Infrastructure Planning (Environmental Impact Assessment) Regulations 2009 and has had regard to the documents and matters referred to in section 104(2) of the 2008 Act.
The Secretary of State, having decided the application, has determined to make an order giving effect to the proposals comprised in the application on terms that in the opinion of the Secretary of State are not materially different from those proposed in the application.
Accordingly, the Secretary of State, in exercise of the powers in section 114 and 120 of the 2008 Act, makes the following Order:
2008 c. 29.
S.I. 2009/2263, amended by S.I. 2012/635 and 2012/787.
Words in Preamble substituted (22.11.2016) by The Meaford Gas Fired Generating Station (Correction) Order 2016 (S.I. 2016/1046), arts. 1, 2, Sch.