PART 2

PRINCIPAL POWERS

Provision of works
6
1
The undertaker may from time to time within the Order limits provide and operate the authorised development, and for these purposes the undertaker may construct and maintain roads, railway lines, buildings, sheds, offices, workshops, depots, walls, foundations, fences, gates, tanks, pumps, conduits, pipes, drains, wires, mains, cables, electrical substations, signals, conveyors, cranes, container handling equipment, lifts, hoists, lighting columns, weighbridges, stairs, ladders, stages, platforms, catwalks, equipment, machinery and appliances and such other works and conveniences as may be necessary or expedient.
2
Without limitation on the scope of paragraph (1) the undertaker may within the Order limits carry out and maintain such other works as may be necessary or convenient for the purposes of, or in connection with or in consequence of, the construction, maintenance or use of the authorised development, including—
a
works for the accommodation or convenience of vessels (including but not limited to berthing heads, mooring posts, ladders, buoys, bollards, dolphins, fenders, rubbing strips and fender panels, fender units and pontoons);
b
works to divert, remove or replace apparatus, including mains, sewers, drains, pipes, conduits, cables, electrical substations and electrical lines; and
c
landscaping and other works to mitigate any adverse effect of the construction, maintenance and operation of the works or to benefit or protect any person or premises affected by the construction, maintenance and operation of the works.
3
Nothing in this article authorises—
a
any works that would give rise to any significant environmental effects not assessed in the environmental statement; and
b
the construction of railway lines, buildings, sheds, offices, workshops, depots, electrical substation, container handling equipment or weighbridges within the pipeline corridor or within the lagoon.
Art. 6 in force at 10.8.2016, see art. 1