PART 6

MISCELLANEOUS AND GENERAL

Certification of plans etc.
38
1
The undertaker, as soon as practicable after the making of this Order, must submit to the Secretary of State copies of—
a
the book of reference (Document 5.3B);
b
the land plans (Documents 2.1, 2.1A to 2.1B(i), 2.1C to 2.1J(i) and 2.1K to 2.1N(i));
c
the environmental statement (Documents 6.4 and 6.5);
d
the works plans (Documents 2.2A to F);
e
the vertical deviation plan (Document 3.11B);
f
the parameters table (Document 6.9A);
g
the highway works plan (Document 3.14);
h
the mitigation and monitoring strategy (Document 6.12A);
i
the conveyor route plans (Documents 3.3H to O);
j
the governance tracker (Document 6.8B);
k
the outline construction environmental management plan (Document 6.10A);
l
the outline ecological management plan (Document 6.11B);
m
the constructability notes;
n
the pipeline corridor plans (Documents 3.15A to C);
o
drawing number PB1586 – SK123 Revision 2 (Document 3.9B) showing the “river frontage line”;
p
drawing number PB1586 – SK1081 Revision D (Document 3.16) showing the access arrangements for the Redcar Bulk Terminal conveyor;
q
drawing numbers PB1586-SK1026 Revision E (Document 3.5A) and PB1586-SK1027 Revision G (Documents 3.5B) showing locations of screen fencing; and
r
the Wilton Complex Plan (drawing number T-MIS-0065-01),
for certification that they are true copies of the documents referred to in this Order.
2
Where the amendment of any plan or document referred to in paragraph (1) is required to reflect the terms of the Secretary of State’s decision to make this Order, that plan or document, in the form amended to the Secretary of State’s satisfaction, is the version of the plan or document to be certified under paragraph (1).
3
A plan or document so certified is admissible in any proceedings as evidence of the contents of the document of which it is a copy.
Art. 38 in force at 10.8.2016, see art. 1